Resolution Colours Refresh rate (Hz) Pixel rate (MHz) DRAM only 1280 x 1024 4 greys 60 110 1024 x 768 16 70 75 800 x 600 256 56 36 1MB VRAM 16 60 110 256 70 75 32K 56 36 2MB VRAM 1280 x 1024 256 60 110 1024 x 768 32K 70 75 800 x 600 16m 56 36

1280 x 1024 1024 x 768 800 x 600